WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Bloomfield, John Arthur Douglas Lord
birth: 1802-11-12, Newport
death: 1879-08-17, Notting Hill
sex: m
occupation: Diplomat
residence: Lissabon
residence: Stuttgart
residence: Stockholm
residence: St. Petersburg
residence: Berlin
residence: Wien