WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Bausset-Roquefort, Louis François Joseph de
birth: 1770-01-01/1770-12-31
death: 1830-01-01/1830-12-31
sex: m
occupation: Vorsteher des Kaiserpalastes
residence: Paris
residence: Wien
residence: Parma