WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Buchberger, Johann Siegmund
identifier: BachDigitalPerson_agent_00001603
death: 1762, 1763
sex: m
occupation: Organist
occupation: Kantor
residence: Löbau
Organist in Löbau um 1730