WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Emett, John George
identifier: BachDigitalPerson_agent_00002019
birth: 1787
death: 1847, London
sex: m
occupation: Organist
residence: London
ab 1830 Organist der Kirche St Mary Magdalen in Bermondsey, London