WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Gleichmann, Johann Georg
identifier: BachDigitalPerson_agent_00002376
birth: 1685-12-22, Stelzen
death: 1770
sex: m
occupation: Organist
residence: Ilmenau