WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

135203023 BachDigitalPerson_agent_00000382 Jimmerthal, Hermann Jimmerthal, Johann Hermann Thomas [Ab 1845 Organist der Marienkirche in Lübeck.]