WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Pfeiffer, Adolph; Pfeiffer, Johann Nicolaus Adolph
identifier: BachDigitalPerson_agent_00000386
birth: 1815-03-20, Lübeck
death: 1893-10-08, Lübeck
sex: m
occupation: Organist
residence: Lübeck
Organist der Aegidienkirche in Lübeck.