WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Jähnig, Max Emil
birth: 1866-06-01, Dresden
death: 1940-03-20, Stuttgart
sex: m
occupation: Cellist
residence: Stuttgart
1892 bis 1933 Cellist der Hofkapelle in Stuttgart