WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Venzano, Luigi
birth: 1814-01-01/1816-12-31, Genua
death: 1878-01-26, 1878-01-27, Genua
sex: m
occupation: Cellist
residence: Genua
Solo-Vc. im Theaterorchester Carlo Felice und Lehrer am Musikinstitut Genua