WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Arresti, Floriano Maria
identifier: 1035791161
identifier: BachDigitalPerson_agent_00001139
birth: 1667-12-15, Bologna
death: 1717, Bologna
sex: m
occupation: Komponist
occupation: Organist
residence: Rom
residence: Bologna
Ab 1703 Organist der Basilika San Petronio in Bologna.