WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Bach, Johann Friedrich
identifier: BachDigitalPerson_agent_00001200
birth: 1682-01-01/1682-12-31
death: 1730-02-08, Mühlhausen
sex: m
occupation: Organist
residence: Mühlhausen