WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Bower, John Dykes; Bower, Sir John Dykes
identifier: 174027699
identifier: BachDigitalPerson_agent_00001518
birth: 1905-08-13, Gloucester
death: 1981-05-29, Orpington
sex: m
occupation: Organist
residence: Truro
residence: Oxford
residence: Durham (England)
residence: London
Organist an St. Paul's Cathedral