WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

131942522 BachDigitalPerson_agent_00002214 Freyer, August Freyer, Karl August [ab 1837 Organist der Dreifaltigkeitskirche in Warschau]