WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Keller, Heinrich Michael
identifier: 48780132
identifier: BachDigitalPerson_agent_00003057
birth: 1638-02-10, Nordhausen
death: 1710-05-20, Frankenhausen
sex: m
occupation: Organist
residence: Frankenhausen