WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

McCullough, John C.
identifier: BachDigitalPerson_agent_00003616
birth: 1912-03-26, Higgins, Texas
death: 2011-01-03, Whitewater
sex: m
occupation: Elektriker
occupation: Kältetechniker