WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Mitchell, John
identifier: BachDigitalPerson_agent_00003713
birth: 1809-07-04, Eton
death: 1892-01-13
sex: m
occupation: Chorist
residence: Windsor
Chorist in St George’s Chapel (Windsor Castle)