WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Schütte, Adolf; Schütte, Adolf Heinrich
identifier: 127718702
identifier: BachDigitalPerson_agent_00004706
birth: 1878-11-29, Jever
death: 1957-07-01, Delmenhorst
sex: m
occupation: Pfarrer
occupation: Orgelsachverständiger
residence: Ratekau
residence: Altenesch
residence: Osternburg