WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Riedel, Johann
sex: m
occupation: Cellist
birth: 1727-01-01/1727-12-31
death: 1775-01-01/1775-12-31
aus St. Petersburg