WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Kerner, Dieter
identifier: 131605186
birth: 1923-02-16
death: 1981-11-02, Mainz-Gonsenheim
sex: m
occupation: Arzt
occupation: Medizinhistoriker
residence: Mainz